Responsive Menus (7.x-1.6) - en to unknown language translation catalogue (10 entries)

en: Save configuration
target: Goym samanseting

en: Yes
target: Ja

en: No
target: Nei

en: The configuration options have been saved.
target: Samansetingarmøguleikarnir eru goymdir.

en: Menu
target: Valmynd

en: Expanded
target: Víðkað

en: Custom
target: Sergjørt

en: The settings have not been saved because of the errors.
target: Setingarnar eru ikki goymdar vegna feilirnar.

en: Right to left
target: Høgra til vinstra

en: Left to right
target: Vinstra til høgra
