RESTmini (7.x-1.4) - en to unknown language translation catalogue (5 entries)

en: General settings
target: Generelle innstillinger

en: no
target: nei

[ctx: module:restmini]
en: no
target: nei

[ctx: module:restmini]
en: yes
target: ja

[ctx: module:restmini]
en: optional
target: valgfri
