Reuse Cached 404s (7.x-1.1) - en to unknown language translation catalogue (3 entries)

en: Other
target: Annet

en: Page not found
target: Side ikke funnet

en: The requested page "@path" could not be found.
target: Siden "@path" ble ikke funnet.
