Ricochet Maintenance Helper (7.x-1.3) - en to unknown language translation catalogue (6 entries)

en: Save configuration
target: Salvar configurações

en: Disabled
target: Desativado

en: Every hour
target: Toda hora

en: API Key
target: Chave de API

en: Advanced
target: Avançado

en: Frequency
target: Frequência
