Ricochet Maintenance Helper (7.x-1.3) - en to unknown language translation catalogue (6 entries)

en: Save configuration
target: Guardar configuração

en: Disabled
target: Desativado

en: Every hour
target: Todas as horas

en: API Key
target: Chave API

en: Advanced
target: Avançado

en: Frequency
target: Frequência
