RRD Graphical Dashboard (7.x-1.2) - en to unknown language translation catalogue (14 entries)

en: Pages
target: Páginas

en: 1 Hour
target: 1 Hora

en: User
target: Usuário

en: System
target: Sistema

en: 1 Day
target: 1 Dia

en: 1 Week
target: 1 Semana

en: 1 Year
target: 1 Ano

en: Blocked
target: Bloqueado

en: Used
target: Usado

en: Stopped
target: Parado

en: Read
target: Lida

en: Locked
target: Bloqueado

en: Cached
target: Armazenado em cache

en: Not Available
target: Não Disponível
