S3 File Sync (7.x-1.0-beta3) - en to unknown language translation catalogue (6 entries)

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað

en: Edit
target: Broyt

en: Region
target: Øki

en: image
target: mynd

en: Cron could not run because the site is in maintenance mode.
target: Cron kundi ikki koyra tí at heimasíðan er í viðlíkahaldsstøðu.
