S3FS File Proxy to S3 (7.x-2.0-alpha0) - en to unknown language translation catalogue (1 entry)

en: HTTP error @errorcode occurred when trying to fetch @remote.
target: HTTP feilur @errorcode kom fyri tá ið roynt varð at fáa fatur á @remote.
