Settings Menu Link (7.x-1.0) - en to unknown language translation catalogue (5 entries)

en: delete
target: 刪除

en: Delete
target: 刪除

en: Path
target: 路徑

en: The menu system stores system paths only, but will use the URL alias for display. %link_path has been stored as %normal_path
target: 選單系統僅儲存系統路徑，但在顯示時會使用網址別名。%link_path 會以 %normal_path 來儲存。

en: The path for this menu link. This can be an internal Drupal path such as %add-node or an external URL such as %drupal. Enter %front to link to the front page.
target: 此選單項目連結到的路徑。路徑可以是 Drupal的內部連結，像是 %add-node，也可以是外部網址，像是 %drupal。或者可以輸入 %front，連結到網站首頁。
