Settings reset button (7.x-1.0-rc1) - en to unknown language translation catalogue (3 entries)

en: User interface
target: 使用者介面

en: Reset to defaults
target: 重設到預設值

en: The configuration options have been reset to their default values.
target: 設定選項已被重設至預設值。
