shs search api (7.x-1.0) - en to unknown language translation catalogue (2 entries)

en: never
target: aldri

en: An invalid vocabulary is selected. Please change it in the options.
target: Et ugyldig vokabular er valgt. Vennligst endre det i innstillingene.
