SimpleTest Fixture (7.x-1.6) - en to unknown language translation catalogue (2 entries)

en: Testing
target: Testando

en: 1 e-mail was sent during this test. | @count e-mails were sent during this test.
target[0]: 1 e-mail foi enviado durante este teste.
target[1]: @count e-mails foram enviados durante este  teste.
