SimpleTest Fixture (7.x-1.6) - en to unknown language translation catalogue (2 entries)

en: E-mail
target: 電子郵件

en: 1 e-mail was sent during this test. | @count e-mails were sent during this test.
target[0]: 1 封電子郵件已於這個測試進行時寄出。
target[1]: @count 封電子郵件已於這個測試進行時寄出。
