SN Quick Multisite (7.x-1.0) - en to unknown language translation catalogue (5 entries)

en: Yes
target: Ja

en: No
target: Nei

en: About
target: Om

en: File Transfer failed, reason: !reason
target: Klarte ikke overføre fil fordi: !reason

en: Preparing to install
target: Forbereder installasjon
