SN Quick Multisite (7.x-1.0) - en to unknown language translation catalogue (5 entries)

en: Yes
target: 是

en: No
target: 否

en: About
target: 关于

en: File Transfer failed, reason: !reason
target: 文件传输失败，原因：!reason

en: Preparing to install
target: 正在准备安装
