System Status AJAX (7.x-1.1) - en to unknown language translation catalogue (3 entries)

en: Administration
target: Fyrisiting

en: You do not have any administrative items.
target: Tú hevur ikki nakrar fyrisitingarligar liðir.

en: One or more problems were detected with your Drupal installation. Check the <a href="@status">status report</a> for more information.
target: Eini ella fleiri trupulleikar vórðu staðfestir við Drupal innleggingina. Sí <a href="@status">støðufrágreiðingina</a> til at fáa fleiri upplýsingar.
