Tingle.js - Vanilla JS Modal Library (7.x-1.0-alpha3) - en to unknown language translation catalogue (2 entries)

en: User interface
target: Eadar-aghaidh a' chleachdaiche

en: Not installed
target: Cha deach a stàladh
