Ultimate Cron (7.x-2.0-beta8) - en to unknown language translation catalogue (44 entries)

en: Title
target: Tittel

en: enabled
target: aktivert

en: Operations
target: Handlinger

en: disabled
target: deaktivert

en: Disabled
target: Deaktivert

en: Yes
target: Ja

en: No
target: Nei

en: Logs
target: Logg

en: Message
target: Melding

en: Settings
target: Innstillinger

en: Name
target: Navn

en: settings
target: innstillinger

en: Default
target: Standard

en: Time
target: Tid

en: Configure
target: Konfigurer

en: Module
target: Modul

en: Never
target: Aldri

en: Throttle
target: Begrensning

en: Overridden
target: Overstyrt

en: N/A
target: &mdash;

en: General
target: Generelt

en: Cache
target: Hurtigbuffer

en: Duration
target: Varighet

en: Threshold
target: Terskel

en: Rules
target: Regler

en: Administer
target: Administrer

en: Fixed
target: Fast

en: Interval
target: Intervall

en: by
target: av

en: Storage
target: Lagring

en: Simple
target: Enkel

en: Any
target: Hva som helst

en: Started
target: Startet

en: Queue
target: Kø

en: Scheduled
target: Planlagt

en: - All -
target: - Alle -

en: Scheduler
target: Tidsplanlegger

en: Initial message
target: Opprinnelig melding

en: Cron could not run because an invalid key was used.
target: Cron kunne ikke kjøre fordi en ugyldig nøkkel ble brukt.

en: Unlock
target: Åpne

en: Run cron every
target: Kjør cron hver

en: @name manually unlocked by user @username (@uid)
target: @name manuelt låst opp av bruker @username (@uid)

en: Cron is running properly.
target: Cron kjører uten problemer.

en: @count job is behind schedule | @count jobs are behind schedule
target[0]: @count jobb er forsinket
target[1]: @count jobber er forsinket
