Units of Measurement (7.x-1.0-alpha1) - en to unknown language translation catalogue (5 entries)

en: Status
target: Støða

en: Description
target: Lýsing

en: Disabled
target: Óvirkjað

en: Enabled
target: Virkjað

en: Factor
target: Faktorur
