Units of Measurement (7.x-1.0-alpha2) - en to unknown language translation catalogue (7 entries)

en: Status
target: وضعیت

en: Description
target: شرح

en: Disabled
target: غیرفعال

en: Enabled
target: فعال

en: Label
target: برچسب

en: Module
target: ماژول

en: Factor
target: عامل
