Units of Measurement (7.x-1.0-alpha2) - en to unknown language translation catalogue (8 entries)

en: Status
target: Estado

en: Description
target: Descrição

en: Disabled
target: Desativado

en: Enabled
target: Ativado

en: Label
target: Etiqueta

en: Module
target: Módulo

en: Units
target: Unidades

en: Symbol
target: Símbolo
