Users Mobile (7.x-1.2) - en to unknown language translation catalogue (3 entries)

en: Register
target: Registrer

en: error
target: feil

en: The signature is too long: it must be %max characters or less.
target: Signaturen er for lang. Den kan være opp til %max tegn.
