µSync (7.x-1.0) - en to unknown language translation catalogue (5 entries)

en: Status
target: Staid

en: Field
target: Raon

en: Content type
target: Seòrsa na susbainte

en: Module
target: Mòideal

en: Source
target: Tùs
