Utility Image Rebuild (7.x-1.0) - en to unknown language translation catalogue (2 entries)

en: Utility
target: Utilitário

en: An error occurred while processing %error_operation with arguments: @arguments
target: Um erro ocorreu ao processar %error_operation com os argumentos: @arguments
