jQuery-viewport-checker (7.x-1.4) - en to unknown language translation catalogue (3 entries)

en: Pages
target: Páginas

en: Show for the listed pages
target: Mostrar para as páginas listadas

en: Hide for the listed pages
target: Esconder para as páginas listadas
