Views Fluid Grid (7.x-3.0) - en to unknown language translation catalogue (15 entries)

en: Disabled
target: Deaktivert

en: Enabled
target: Aktivert

en: None
target: Ingen

en: Center
target: Midtstilt

en: Views
target: Visninger

en: Horizontal
target: Horisontal

en: Vertical
target: Vertikal

en: Width
target: Bredde

en: Height
target: Høyde

en: Alignment
target: Justering

en: Left
target: Venstre

en: Right
target: Høyre

en: Inherit
target: Arve

en: Border radius
target: Radius på hjørner for ramme

en: Justify
target: Juster
