Views jQFX Galleria (7.x-1.0-alpha1) - en to unknown language translation catalogue (12 entries)

en: Disabled
target: À comas

en: Enabled
target: An comas

en: Views
target: Seallaidhean

en: History
target: Eachdraidh

en: Theme
target: Ùrlar

en: Width
target: Leud

en: Height
target: Àirde

en: next
target: air adhart

en: Counter
target: Cunntair

en: Show
target: Seall

en: Empty
target: Falamh

en: Extend
target: Leudaich
