Visual Website Optimizer (7.x-1.1) - en to unknown language translation catalogue (8 entries)

en: Pages
target: dapi ches

en: Save configuration
target: configuraziun arcunar

en: Disabled
target: deactivar

en: Enabled
target: intimar

en: Advanced settings
target: parameters extendids

en: Statistics
target: statisticas

en: Filter
target: filter

en: Save settings
target: preferenzas arcunar
