Webform Chart (7.x-1.0-rc1) - en to unknown language translation catalogue (5 entries)

en: None
target: Nenhum

en: Required
target: Obrigatório

en: Global settings
target: Definições globais

en: Optional
target: Opcional

en: Installed
target: Instalado
