Webform Chart (7.x-1.0-rc2) - en to unknown language translation catalogue (7 entries)

en: None
target: Nenhum

en: Required
target: Obrigatório

en: Global settings
target: Configurações globais

en: Optional
target: Opcional

en: Not Installed
target: Não instalado

en: Installed
target: Instalado

en: Chart Type
target: Tipo de gráfico
