Webform SameAs (7.x-1.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Display mode
target: Modo de exibição

en: Webform
target: Formulário

en: Default value
target: Valor predefinido

en: The default value of the field.
target: O valor predefinido do campo.
