TMGMT Workflow (7.x-1.0-beta1) - en to unknown language translation catalogue (7 entries)

en: Disabled
target: Deaktivert

en: Enabled
target: Aktivert

en: Weight
target: Vekt

en: Not found
target: Ikke funnet

en: State
target: Status

en: Workflow
target: Arbeidsflyt

en: Translator
target: Oversetter
