WYSIWYG toolbar per role (7.x-1.1) - en to unknown language translation catalogue (3 entries)

en: User interface
target: Interface de usuário

en: Default
target: Padrão

en: Wysiwyg profile for %format has been saved.
target: O perfil Wysiwyg para %format foi salvo.
