Feeds Personify (8.x-1.0-beta1) - en to unknown language translation catalogue (3 entries)

en: Username
target: Nome de utilizador

en: Password
target: Senha

en: The feed from %site seems to be broken because of error "%error".
target: O feed do %site parece estar quebrado devido ao erro "%error".
