getID3() (8.x-1.0-alpha1) - en to unknown language translation catalogue (3 entries)

en: Version
target: Versão

en: If you're seeing this it indicates that the getID3 library was found.
target: Se está a ver isso, significa que a biblioteca getID3 foi encontrada.

en: About
target: Sobre
