GraphQL Webform (8.x-1.0-alpha5) - en to unknown language translation catalogue (4 entries)

en: The file %file could not be saved. An unknown error has occurred.
target: Fila %file kan ikke lagres. En ukjent feil oppstod.

en: The specified file %name could not be uploaded.
target: Klarte ikke å laste opp fila %name.

en: The file %file could not be saved because the upload did not complete.
target: Filen %file kunne ikke lagres fordi opplastingen ikke ble fullført.

en: The file %file could not be saved because it exceeds %maxsize, the maximum allowed size for uploads.
target: Filen %file kunne ikke lagres fordi den overskrider %maxsize, maksimalt tillatt størrelse for opplasting.
