JScroll Pane (8.x-1.0-alpha2) - en to unknown language translation catalogue (6 entries)

en: User interface
target: Interface do utilizador

en: Yes
target: Sim

en: No
target: Não

en: True
target: Verdadeiro

en: False
target: Falso

en: About
target: Sobre
