Lightgallery (8.x-1.0-beta1) - en to unknown language translation catalogue (7 entries)

en: None
target: Nenhum

en: Not found
target: Não encontrado

en: Original image
target: Imagem original

en: Middle
target: Meio

en: Left
target: Esquerda

en: Right
target: Direita

en: Installed
target: Instalado
