Link checker (8.x-1.1) - en to unknown language translation catalogue (9 entries)

en: Operations
target: Atgerðir

en: Disabled
target: Óvirkjað

en: Reset
target: Tómstilla

en: Settings
target: Setingar

en: General settings
target: Almennar setingar

en: Error
target: Feilur

en: Page
target: Síða

en: Never
target: Ongantíð

en: Failed
target: Miseydnaðist
