Luxiflux Design Tool Integrator (1.0.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Username
target: Nome de utilizador

en: Password
target: Senha

en: Custom
target: Personalizado

en: About
target: Sobre
