Microspid PASW (2.0.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Save
target: arcunar

en: Medium
target: medischina

en: role
target: cupitgarola

en: Site default language code
target: il qual, la quala pagina-web
