Moderation Scheduler (8.x-1.2-alpha1) - en to unknown language translation catalogue (3 entries)

en: 1 minute
target: 1 minuto

en: Cron ran successfully.
target: O cron completou a execução.

en: Cron run failed.
target: A execução do cron falhou.
