Monitoring (8.x-1.0-alpha1) - en to unknown language translation catalogue (14 entries)

en: Value
target: Værdi

en: Actions
target: Handlinger

en: Remove
target: Fjern

en: - None -
target: - Ingen -

en: Timestamp
target: Tidspunkt

en: Unknown
target: Ukendt

en: Severity
target: Grad

en: Count
target: Antal

en: Table
target: Tabel

en: Log in
target: Log ind

en: Uninstall
target: Afinstallér

en: Session closed for %name.
target: Session lukket for %name.

en: Result
target: Resultat

en: Login attempt failed for %user.
target: Login-forsøg mislykkedes for %user.
