New Relic RPM Integration (8.x-1.0-alpha1) - en to unknown language translation catalogue (4 entries)

en: Enable
target: Aktiver

en: Disable
target: Deaktiver

en: Settings
target: Innstillinger

en: API Key
target: API-nøkkel
