Page Not Found Passthrough (Redirect on 404) (1.0.0-beta4) - en to unknown language translation catalogue (10 entries)

en: Settings
target: 设置

en: Redirect
target: 重定向

en: 301 Moved Permanently
target: 301永久移动

en: 307 Temporary Redirect
target: 307临时重定向

en: 302 Found
target: 302临时重定向

en: 303 See Other
target: 303查看其它位置

en: Page not found
target: 页面未找到

en: Search path
target: 搜索路径

en: The path '%path' has to start with a slash.
target: 路径“%path”必须以斜杠开头。

en: Either the path '%path' is invalid or you do not have access to it.
target: 或者路径 '%path'是无效的，或者你没有访问它的权限.
