openweathermap.org (1.0.0-beta1) - en to unknown language translation catalogue (4 entries)

en: Update interval in minutes
target: Eadaramh ùrachaidh ann am mionaidean

en: Country
target: Dùthaich

en: Settings
target: Roghainnean

en: standard
target: stannardach
