Passwordless (2.0.0-alpha1) - en to unknown language translation catalogue (2 entries)

en: User %name used one-time login link at time %timestamp.
target: Brugeren %name brugte et engangslogind-link %timestamp.

en: You have tried to use a one-time login link that has expired. Please request a new one using the form below.
target: Du har forsøgt at bruge en engangslogind-URL som er udløbet. Brug formularen herunder til at anmode om en ny.
