Pattern Library (8.x-1.0-alpha1) - en to unknown language translation catalogue (5 entries)

en: - None -
target: - Einki -

en: Settings
target: Setingar

en: Field
target: Rein

en: Default
target: Standard

en: Field settings
target: Reinasetingar
