Pattern Library (8.x-1.0-alpha1) - en to unknown language translation catalogue (10 entries)

en: User interface
target: Brukergrensesnitt

en: - None -
target: - Ingen -

en: Settings
target: Innstillinger

en: Field
target: Felt

en: Default
target: Standard

en: Field name
target: Feltnavn

en: Property
target: Egenskap

en: Field settings
target: Feltalternativer

en: - Select -
target: - Velg -

en: - Default -
target: - Standard -
