Plyr media player (8.x-1.0-alpha1) - en to unknown language translation catalogue (7 entries)

en: Loop
target: Ciclo

en: Duration
target: Duração

en: Controls
target: Controlos

en: Autoplay
target: Início automático

en: Current time
target: tempo actual

en: Fullscreen
target: Ecrã inteiro

en: Progress bar
target: Barra de progresso
